R (mm) Δ

0 200

400 600

800 1000

1200

s)μ T ( Δ

0 200 400 600 800

(MeV)

delayed E

1.5 2.0 2.5 3.0

(MeV)

delayed E

0

50

100

150

Δ

Δ

0

E

E

0